.Main Window

- Select *WSPR-2* from the *Mode* menu and.  The main window will
reconfigure itself by removing some controls not used in WSPR mode.
You may wish to use the mouse change the width and height of the
window accordingly.

- Select *Tab 3* (below the *Decode* button).

.Wide Graph Settings
- *Bins/Pixel* = 2
- *Start* = 1000 Hz
- *N Avg* = 10
- *Flatten* = checked
- Select *Cumulative* for data display.

- Use the mouse to adjust the width of the *Wide Graph* so its upper
frequency limit is about 2000 Hz.

