// Status=review

Download and execute the package file {win32}, following these
instructions:

- Install _WSJT-X_ into its own directory rather than in the conventional
location +C:\Program Files\WSJTX+.  Suggested installation directories are
+C:\WSJTX+ or +C:\WSJT\WSJTX+.

- All program files relating to _WSJT-X_ will be stored in the chosen
installation directory and its subdirectories. 

- Logs and other writeable files will normally be found in the 
directory +C:\Users\<username>\AppData\Local\WSJT-X+.

IMPORTANT: Note that your computer might be configured so that this
directory is ``invisible''.  It's there, however, and accessible.
An alternative (shortcut) directory name is %LOCALAPPDATA%\WSJT-X\.

- The built-in Windows facility for time synchronization is usually
not adequate. We recommend the program _Meinberg NTP_: see {ntpsetup}
for downloading and installation instructions.

- _WSJT-X_ expects your sound card to do its raw sampling at 48000 Hz.
To ensure that this will be so when running under recent versions of
Windows, open the system's *Sound* control panel and select in turn the
*Recording* and *Playback* tabs. Click on *Properties*, then
*Advanced*, and select *16 bit, 48000 Hz (DVD Quality)*.

- You can uninstall _WSJT-X_ by clicking its *Uninstall* link in the
Windows *Start* menu, or by using *Uninstall a Program* on the
Windows Control Panel.
